./Dirigent.sh --discharge --UBt 00 --TBt 0 --Ucd 00 --Tcd 1000 --preionization 1 --gas H --pressure 15 --diagnostics.limitermirnovcoils "vacuum_shot=37050" --discharge.position_stabilization "main_switch='on',radial_switch='on',vertical_waveform='5000,0;9000,20;17000,0',vertical_switch='on',radial_waveform='7000,0;8000,-10;10000,0'" --diagnostics.stripdetector "r_sensor=80,phi_sensor=0,acq_time=200,acq_delay=100,acq_mode=3" --ScanDefinition "" --comment "Standard discharge  by master"