./Dirigent.sh --discharge --UBt 00 --TBt 0 --Ucd 0 --Tcd 1000 --preionization 1 --gas H --pressure 15 --diagnostics.limitermirnovcoils "vacuum_shot=37050" --infrastructure.radial_stabilization "switch=on,fg_waveform=5000:0;9000:20;17000:0" --infrastructure.vertical_stabilization "switch=off,fg_waveform=14000:1;15000:0" --ScanDefinition "" --comment "dummy : SW develop by master"