./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=1000,t_Bt=0,O_Bt='CW',U_cd=450,t_cd=0,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',U_v=20,p_H=-1" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='1000,0;2000,-5;7000,-10;8000,-20;30000,0',radial_switch='on',radial_waveform='1000,0;2000,-5;5000,-10;9000,-20;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=41794" --infrastructure.biasingelectrode "main_switch='on',waveform='1000,0;2000,-10;5000,0;6000,0;14000,0'" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --comment "Regime optimization"