./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='41794'" --infrastructure.bt_ecd "U_Bt=1300,t_Bt=0,O_Bt='CW',U_cd=700,t_cd=1500,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',U_v=20.5,p_H=-1" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='3000,0;7000,-5;8000,-20;30000,0',radial_switch='on',radial_waveform='2000,0;3000,-5;5000,-10;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=41794" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --diagnostics.stripdetector "r_sensor=80,acq_time=100,acq_delay=100,acq_mode=0" --comment "rad and HXR - CeBr3A position change"