./Dirigent.sh --discharge --UBt 800 --TBt 1000 --Ucd 450 --Tcd 2000 --preionization 1 --gas H --pressure 10 --Bt_orientation CW --CD_orientation CW --vacuum_shot 33960 --comment "Camera Exilim  centered to the HFS 20 mm from port center"