./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=1150,t_Bt=0,U_cd=550,t_cd=1000,O_Bt='CW',O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=120,U_accel=100" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=10,U_v=15" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',radial_waveform='1000,0;7000,-5;10000,-11;14000,-20;30000,0',vertical_switch='on',vertical_waveform='1000,0;4000,-5;8000,-10;11000,-20;30000,0'" --comment "RE tuning shifted stab repeat after quick GD"