./Dirigent.sh --discharge --operation.higherpower "voice='on',analysis='off',wg_voice='on',RawDataAcquiring='on',diagnostics_onstage='off',diagnostics_offstage='off',infrastructure='on'" --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=0,t_Bt=0,O_Bt='CW',U_cd=0,t_cd=1000,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=19" --infrastructure.currentstabilization "main_switch='on',waveform='1000,0;2000,-20;10000,20;18000,-20;26000,0'" --comment "Commissioning into a chamber with max change of current per 8 ms and calibration of oscope"