./Dirigent.sh --discharge --UBt 650 --TBt 0 --Ucd 600 --Tcd 0 --preionization 1 --gas H --pressure 12 --comment "Moscow Institute of Physics and Technology 2021 Group 1 Group1, Ub = 650, Ucd = 600 (3rd)"