./Dirigent.sh --discharge --UBt 1200 --TBt 0 --Ucd 550 --Tcd 15000 --preionization 1 --gas H --pressure 40 --comment "Golem remote opearation workshop for the IWSSPP, Bulgaria Group 2 Group 3 - Victor, delay time before the B_tor max"