./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=1000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=27.5" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',radial_waveform='1000,0;2000,-5;5000,-10;9000,-20;30000,0',vertical_switch='on',vertical_waveform='1000,0;2000,-5;7000,-10;8000,-20;30000,0'" --diagnostics.rakeprobe "r_First_Tip=100,phi_First_Tip=0,X_mod='111111111111',I_SilverBox=12,r_manipulator=60,phi_manipulator=0" --diagnostics.doublerakeprobe "r_First_Tip=100,X_mod='111111111111',I_SilverBox=0" --infrastructure.biasingelectrode "main_switch='on',waveform='1000,0;7000,+10;14000,0',position=90" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --comment "Long negative biasing later start, stabilization earlier start"