./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=250,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=22" --comment "Skupina Sigma, vyboj 4, opakujeme vyboj 44647 znova s vyssim napetim  na ventilu, jelikoz se nam nepovedl zopakovat "