./Dirigent.sh --discharge --UBt 000 --TBt 1000 --Ucd 0 --Tcd 2000 --preionization 1 --gas H --pressure 10 --comment "Dirigent service" --vacuum_shot -1 --diagnostics_doublerakeprobe "r_First_Tip=90, X_mod=222222222220, I_SilverBox=11" --diagnostics_petiprobe "r_LP_tip=70, f_fg=5000, u_fg=2, r_i=47, is_bpp=1, is_lp=2" --diagnostics_limitermirnovcoils vacuum_shot=-1 --ScanDefinition "0"