./Dirigent.sh --discharge --operation.discharge "style='sujb'" --infrastructure.bt_ecd "U_Bt=1200,t_Bt=0,O_Bt='CW',U_cd=700,t_cd=7000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=80,U_accel=90" --infrastructure.workinggas "S_mode='U_v',S_gas='H',U_v=23.0,p_H=-1" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='3000,-5;7000,-5;10000,-20;30000,0',radial_switch='on',radial_waveform='2000,0;3000,-5;7000,-20;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=-1" --comment "Vysoky tlak stab posouvam tcd po vydoutnani"