./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=600,t_cd=1000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=23" --diagnostics.rakeprobe "r_First_Tip=100,phi_First_Tip=0,X_mod='111111111111',I_SilverBox=12,r_manipulator=100,phi_manipulator=0" --diagnostics.doublerakeprobe "r_First_Tip=100,X_mod='111111111111',I_SilverBox=0" --infrastructure.biasingelectrode "main_switch='on',waveform='5000,2,0',position=80" --comment "test sine biasing updated control, 20 waves in burst, higher freq"