./Dirigent.sh --discharge --UBt 700 --TBt 0 --Ucd 400 --Tcd 500 --preionization 1 --gas H --pressure 8 --comment "Technical University of Eindhoven VPS Videoconference for Group 4 Group 8, low pressure shot"