./Dirigent.sh --discharge --UBt 1200 --TBt 1000 --Ucd 450 --Tcd 2000 --preionization 1 --gas H --pressure 10 --Bt_orientation CW --CD_orientation CW --comment "Signal test u=-104.6 UBt = 1200 Ucd = 450 was 400"