./Dirigent.sh --discharge --UBt 800 --TBt 1000 --Ucd 450 --Tcd 2000 --preionization 1 --gas H --pressure 16 --comment "DRP all Vfloat, to see whether there emerged a problem" --diagnostics_doublerakeprobe r_First_Tip=60, X_mod=111111111111, I_SilverBox=12