./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=500,O_Bt='CW',U_cd=350,t_cd=500,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',U_v='21.4'" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='3000,0;5000,0;7000,-15;30000,0',radial_switch='on',radial_waveform='2000,0;3000,0;8000,-20;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=" --comment "UBt800 TBt 500 Ucd 350 Tcd 500 Stab uprava tlaku"