./Dirigent.sh --discharge --UBt 00 --TBt 0 --Ucd 0 --Tcd 1000 --preionization 1 --gas H --pressure 15 --diagnostics.limitermirnovcoils "vacuum_shot=37050" --infrastructure.radial_stabilization "switch='on',fg_waveform='5000,0;9000,20;17000,0'" --infrastructure.vertical_stabilization "switch='on',fg_waveform='7000,1;8000,0'" --ScanDefinition "" --comment "dummy : SW develop by master"