./Dirigent.sh --discharge --UBt 800 --TBt 1000 --Ucd 450 --Tcd 2000 --preionization 1 --gas H --pressure 10 --comment "posunuti offsetu o 40V na iontovou vetev zmena polohy sond  standard shot" --vacuum_shot 35458 --diagnostics_doublerakeprobe "r_First_Tip=100, X_mod=222222222220, I_SilverBox=12" --diagnostics_petiprobe "r_LP_tip=90, f_fg=5000, u_fg=6, r_i=47" --diagnostics_limitermirnovcoils vacuum_shot=35458 --ScanDefinition "0"