./Dirigent.sh --discharge --UBt 1200 --TBt 0 --Ucd 450 --Tcd 2000 --preionization 1 --gas H --pressure 0 --comment "VA char shot2shot scan - Rail probe - r_rp changed - vacuum" --diagnostics_railprobe "r_rp=85, phi_rp=14, u_vachar=20, u_sign=-1, r_rp_vachar=14, r_lp_vachar=27"