./Dirigent.sh --discharge --operation.discharge "style='remote',voice='on',analysis='on',vacuum_shot=!925'" --infrastructure.bt_ecd "U_Bt=1000,t_Bt=0,O_Bt='CW',U_cd=300,t_cd=0,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=80,U_accel=90" --infrastructure.workinggas "S_mode='p_wg',S_gas='H',p_H=32" --infrastructure.positionstabilization "" --infrastructure.biasingelectrode "" --diagnostics.limitermirnovcoils "vacuum_shot=41925" --comment "flouka E = 400 P = 32MP"