./Dirigent.sh --discharge --UBt 750 --TBt 0 --Ucd 500 --Tcd 0 --preionization 1 --gas H --pressure 24 --comment "Technical University of Eindhoven VPS Videoconference for Group 4 Technical university of Eindhoven group 4 group 7 "