./Dirigent.sh --discharge --operation.discharge "style='remote',voice='on',analysis='on'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,U_cd=600,t_cd=1000,O_Bt='CW',O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=100,U_accel=70" --infrastructure.workinggas "S_mode='p_pid',S_gas='H',p_H=12,U_v=22.0" --comment "FiPa Ladnym svahem nasi cesty se previneme pres napeti 800 V"