./Dirigent.sh --discharge --UBt 600 --TBt 0 --Ucd 400 --Tcd 0 --preionization 1 --gas H --pressure 16 --comment "Golem remote opearation workshop for the IWSSPP, Bulgaria Group 2 Group 2 KatkaH: standard discharge"