./Dirigent.sh --discharge --operation.discharge "style='remote',voice='on',analysis='on'" --infrastructure.bt_ecd "U_Bt=1200,t_Bt=5000,U_cd=700,t_cd=6000,O_Bt='CW',O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=100,U_accel=70" --infrastructure.workinggas "S_mode='p_wg',S_gas='H',p_H=5,U_v=22.0" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --diagnostics.doublerakeprobe "r_first_tip=100,X_mod='111111111111',I_SilverBox=0" --diagnostics.stripdetector "acq_time=200,acq_delay=200,acq_mode='0'" --diagnostics.limitermirnovcoils "vacuum_shot='-1'" --comment "motion ampf lampa s graetz mustkem 9"