./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=925,t_Bt=0,O_Bt='CW',U_cd=650,t_cd=900,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=13,U_v=21.5" --comment "Skupina Xi / pokus o 10mPa, vyssi U_Bt (vysoka teplota komory)"