./Dirigent.sh --discharge --UBt 500 --TBt 0 --Ucd 550 --Tcd 1000 --preionization 1 --gas H --pressure 54 --comment "Practical Training for the BUTE, Hungary Group 1 Plasma breakdown limit measurement 16"