./Dirigent.sh --discharge --operation.discharge "style='NotSpecified'" --infrastructure.bt_ecd "U_Bt=750,t_Bt=1000,O_Bt='CW',U_cd=700,t_cd=1750,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=100,U_accel=70" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=10,U_v=23" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',radial_waveform='1000,0;4000,-10;5000,-15;8000,-20;30000,0',vertical_switch='on',vertical_waveform='1000,0;5000,-10;7000,-15;10000,-20;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=-1" --comment "t8-16-previous discharge-qscan6 current increasing slightly with Bt, current discharge:increase Bt-step of 50V-qscan7 "