./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=1000,U_cd=500,t_cd=1000,O_Bt='CW',O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=80,U_accel=70" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=8,U_v=19.9" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --comment "SFP FastCams with Light Off, low pressure"