./Dirigent.sh --discharge --UBt 300 --TBt 0 --Ucd 700 --Tcd 1000 --preionization 0 --gas H --pressure 0 --comment "Practical Training for the BUTE, Hungary Group 1 Vacuum chamber resistivity measurement 3"