./Dirigent.sh --discharge --UBt 400 --TBt 0 --Ucd 600 --Tcd 0 --preionization 1 --gas H --pressure 20 --comment "Technical University of Eindhoven VPS Videoconference for Group 4 Group 8, attempting a disruption"