./Dirigent.sh --discharge --operation.discharge "style='NotSpecified'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=450,t_cd=1000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=100,U_accel=90" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=10,U_v=22" --infrastructure.positionstabilization "main_switch='off',radial_switch='off',vertical_waveform='3000,0;7000,-10;20000,0;25000,0;30000,0',vertical_switch='off',radial_waveform='2000,0;3000,0;9000,-10;11000,-5;22000,-2;25000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=-1" --operation.discharge "style='NotSpecified'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=450,t_cd=1000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=100,U_accel=90" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=10,U_v=22" --infrastructure.positionstabilization "main_switch='on',radial_switch='off',vertical_waveform='3000,0;7000,-10;20000,0;25000,0;30000,0',vertical_switch='off',radial_waveform='2000,0;3000,0;9000,-10;11000,-5;22000,-2;25000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=-1"