./Dirigent.sh --discharge --UBt 800 --TBt 1000 --Ucd 450 --Tcd 2000 --preionization 1 --gas H --pressure 0 --Bt_orientation CW --CD_orientation CW --comment discharge VF: bolometry diagnostics debug, probing bolometer array, control vacuum shot: now machine failure