./Dirigent.sh --discharge --operation.discharge "style='sujb'" --infrastructure.bt_ecd "U_Bt=1100,t_Bt=0,O_Bt='CW',U_cd=800,t_cd=1500,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',U_v='22.1',p_H=0" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='3000,0;7000,0;10000,-20;30000,0',radial_switch='on',radial_waveform='2000,0;3000,0;7000,-20;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=42082" --comment "UBt 1100 Ucd 800 Tcd 1500 stab vysoky tlak"