./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=200,t_Bt=0,O_Bt='CW',U_cd=200,t_cd=1000,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=0" --infrastructure.positionstabilization "main_switch='off',radial_switch='on',radial_waveform='1000,0;2000,-20;22000,0;30000,0',vertical_switch='on',vertical_waveform='1000,0;2000,0;22000,0;50000,1;55000,0'" --comment "3D hall probe calibration - params for discharge, r=44,z=69 mm"