./Dirigent.sh --discharge --operation.discharge "style='NotSpecified'" --infrastructure.bt_ecd "U_Bt=600,t_Bt=1000,O_Bt='CW',U_cd=450,t_cd=2000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=100,U_accel=70" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=10,U_v=20" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',radial_waveform='1000,0;5000,-7;7000,-13;9000,-18;11000,-20;30000,0',vertical_switch='on',vertical_waveform='1000,0;6000,-4;6500,-8;10000,-10;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=-1" --comment "Vertical control still works. Radial control attempt."