./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=1200,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=500,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=-1,U_v=23" --diagnostics.stripdetector "r_sensor=2,acq_time=100,acq_delay=100,acq_mode=0" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='3000,0;7000,0;10000,-20;30000,0',radial_switch='on',radial_waveform='2000,0;3000,0;7000,-20;30000,0'" --comment "Plasma regime optimization - higher U_cd?"