./Dirigent.sh --discharge --operation.discharge "style='remote',voice='on',analysis='on',vacuum_shot=!925'" --infrastructure.bt_ecd "U_Bt=1000,t_Bt=0,O_Bt='CW',U_cd=450,t_cd=0,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=80,U_accel=90" --infrastructure.workinggas "S_mode='p_wg',S_gas='H',p_H=12" --infrastructure.positionstabilization "main_switch='on',vertical_switch='on',vertical_waveform='3000,0;7000,-5;8000,-20;30000,0',radial_switch='on',radial_waveform='2000,0;3000,-5;5000,-20;30000,0'" --infrastructure.biasingelectrode "main_switch='on',waveform='1000,0;5000,20;7500,-20;10000,0;14000,0'" --diagnostics.limitermirnovcoils "vacuum_shot=41925" --comment "R_BE=60, r_DRP=60 zero inductor"