./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=1000,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=22" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',radial_waveform='1000,0;2000,-5;5000,-10;9000,-20;30000,0',vertical_switch='on',vertical_waveform='1000,0;2000,-5;7000,-10;8000,-20;30000,0'" --diagnostics.langballpenprobe "r_lp_tip='48'" --comment "Test sberu dat, misto LP je 9V baterka"