./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=980,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=1000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_gas='H',p_H=15" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --comment "PRAK Beno, Godal, vyboj test 5, rovnaky tlak,rovnake  U_cd a vyssie B_cd"