./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=1000,t_Bt=0,O_Bt='CW',U_cd=600,t_cd=0,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=21" --comment "Skupina Sigma, vyboj 9, replikace vyboje 44354, akorat s nizsim tlakem"