./Dirigent.sh --discharge --operation.discharge "style='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=1000,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=20" --comment "Standard discharge./Dirigent.sh" --operation.discharge "sty-le='standard',vacuum_shot='-1'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=1000,O_cd='CW'" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=22" --infrastructure.positionstabilization "ma-in_switch='on',radial_switch='on',radial_waveform='1000,0;2000,-5;5000,0;6000,-20;30000,0',vertical_switch='on',vertical_waveform='1000,0;2000,-5;7000,-10;8000,-20;30000,0'" --diagnostics.langballpenprobe "r_lp_tip='78',S_mode_lp=float,R_lp_div_osc='10e3',R_lp_div_nosc='1e6',R_bpp_div_osc='10e3',R_bpp_div_nosc='1e6',U_lp='-45',R_lp_isat='47'" --comment "ladeni rozsahu osciloskopu"