./Dirigent.sh --discharge --UBt 600 --TBt 0 --Ucd 500 --Tcd 0 --preionization 1 --gas H --pressure 12 --comment "Moscow Institute of Physics and Technology 2021 Group 1 Group 1, Ub = 600 V, Ucd = 500 V"