./Dirigent.sh --discharge --operation.discharge "style='remote',voice='on',analysis='on'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,U_cd=450,t_cd=0,o_Bt='CW',o_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=80,U_accel=90" --infrastructure.workinggas "S_mode='p_wg',S_gas='H',p_H=15,U_v=22.5" --infrastructure.positionstabilization "main_switch='off',radial_switch='on',radial_waveform='1000,0;2000,-5;5000,-10;9000,-20;30000,0,',vertical_switch='on',vertical_waveform='1000,0;2000,-5;7000,-10;8000,-20;30000,0'" --diagnostics.limitermirnovcoils "vacuum_shot='-1'" --comment "Remote Control Room test 2"