./Dirigent.sh --discharge --operation.discharge "style='remote',voice='on',analysis='on'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,U_cd=350,t_cd=1000,O_Bt='CW',O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='on',U_heater=73,U_accel=40" --infrastructure.workinggas "S_mode='U_v',S_gas='H',p_H=15,U_v=23.0" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',radial_waveform='1000,0;2000,-5;5000,-10;9000,-20;30000,0,',vertical_switch='on',vertical_waveform='1000,0;2000,-5;7000,-10;8000,-20;30000,0'" --infrastructure.biasingelectrode "main_switch='on',waveform='1000,0;3000,-20;15000,0;30000,0',position=90" --diagnostics.doublerakeprobe "r_first_tip=100,X_mod='22222222222',I_SilverBox=0" --diagnostics.limitermirnovcoils "vacuum_shot='-1'" --comment "Preionization Tests"