./Dirigent.sh --discharge --operation.discharge "voice='off',style='dummy',analysis='off',wg_voice='off',RawDataAcquiring='off',diagnostics_onstage='off',diagnostics_offstage='off',infrastructure='on'" --infrastructure.bt_ecd "U_Bt=0,t_Bt=1000,O_Bt='CW',U_cd=0,t_cd=2000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=80,U_accel=90" --infrastructure.workinggas "S_gas='H',p_H=20" --infrastructure.positionstabilization "main_switch='off',radial_switch='on',vertical_waveform='3000,0;12000,-10;22000,0;30000,0',vertical_switch='on',radial_waveform='2000,0;3000,0;9000,0;12000,-10;24000,0;25000,0'" --diagnostics.doublerakeprobe "r_First_Tip=100, X_mod='111111111111', I_SilverBox=12" --diagnostics.rakeprobe "r_First_Tip=100,phi_First_Tip=0,X_mod='111111111111',I_SilverBox=12,r_manipulator=70,phi_manipulator=0" --diagnostics.limitermirnovcoils "vacuum_shot=-1" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=100,U_NIM_A3=600,U_NIM_A4=600" --comment "Dummy discharge"