./Dirigent.sh --discharge --operation.discharge "style='standard'" --infrastructure.bt_ecd "U_Bt=800,t_Bt=0,O_Bt='CW',U_cd=500,t_cd=1000,O_cd='CW'" --infrastructure.preionization "S_device='HotCathode',SW_main='off',U_heater=0,U_accel=0" --infrastructure.workinggas "S_gas='H',p_H=15" --infrastructure.positionstabilization "main_switch='on',radial_switch='on',vertical_waveform='3000,0;6000,-20;22000,0;30000,0',vertical_switch='on',radial_waveform='2000,0;3000,0;6000,-20;9000,-20;24000,0;25000,0'" --diagnostics.scintillationprobes "U_NIM_A1=600,U_NIM_A2=600,U_NIM_A3=600,U_NIM_A4=600" --diagnostics.limitermirnovcoils "vacuum_shot=41561" --comment "SFP distance 1m from coil 12"